Preliminary Agenda WG14/N690

PRELIMINARY AGENDA FOR 23-27 June 1997

MEETING OF ISO/JTC1/SC22/WG14 AND J11

WG14/N690 J11/97-053

23 Oct 97 09:00-12:00 13:30-17:00

24 Oct 97 08:30-12:00 13:30-17:00

25 Oct 97 08:30-12:00 13:30-17:00

26 Oct 97 08:30-12:00 13:30-17:00

27 Oct 97 08:30-12:00

BSI British Standards Institution

British Standards House

389 Chiswick High Road

London W4 4AL

Tel +44(0)181-996-9000

Fax +44(0)181-996-7400

1. Opening Activities

1.1 Opening Comments

1.2 Introduction of Participants/Roll Call

1.3 Selection of Meeting Chair

1.4 Procedures for this Meeting

1.5 Approval of Previous Minutes (WG14/N670)

1.6 Review of Action Items and Resolutions

1.7 Approval of Agenda (WG14/N690)

1.8 Distribution of New Documents

1.9 Information on Next Meeting

2. Reports on Liaison Activities

2.1 X3J11/WG14

2.2 X3J16/WG21

2.3 WG15

WG14/N690 PRELIMINARY AGENDA

2.4 WG20

2.5 Other Liaison Activities

3. Report on CD Registration Ballot (JTC1/SC22 N2444) (Benito)

4. Report of Project Editor (Farance)

5. Report of Rationale Editor (Benito)

6. Defect Reports

6.1 New Defect Reports

6.2 Review of Proposed Responses

7. Revision of ISO/IEC 9899:1990

7.1 Rationale

7.2 Technical Proposals

8. Other Business

9. Future Meetings

9.1 Future Meeting Schedule

9.2 Future Agenda Items

9.3 Future Mailings

10. Resolutions

10.1 Review of Decisions Reached

10.2 Formal Vote on Resolutions

10.3 Review of Action Items

10.4 Thanks to Host

11. Adjournment